Online Time Histories Freyberger, Gilfoyle, and Wolin

Goal. Provide web-based tools to assess to the current CLAS data quality.

Status. The tools are working and in place.

More input is needed from detector groups.

Status 1. It has been in place and working since January.

2. New features have been added to the tools and they have been made more robust.

3. Demonstrated the capability of monitoring the current CLAS data quality.

4. It will be part of the shift tasks for g8.

To Be Done 1. Make the code more robust. 2. Add alarms.

3. GET MORE HELP/INPUT FROM THE DETECTOR GROUPS!