2004-07-14 13:42:05

Entries 314

Mean 120.7

RMS 10.04

/ ndf

2χ 150.8 / 47

Prob 5.569e-15

Low-Bottom 0.1± 100.8

Low-Top 0.222± 6.063

High-Top 0.21± 29.17

High-Bottom 0.150± 3.732

Plateau 4.6± 612.6

(deg) eϕ 90 100 110 120 130 140 150

Events

0 100 200 300 400 500 600 700 800 900 phi_e vs. theta_e vs. p_e_xy

2004-07-14 13:42:39

2004-07-14 13:42:47

2004-07-14 13:43:17

2004-07-14 13:45:27

2004-07-14 13:45:37

region of stable

2004-07-14 13:47:15

efficiency

2004-07-14 13:47:34

Trapezoid Fit

2004-07-14 13:48:29

2004-07-14 13:48:57

= 1.4 GeV ep

2004-07-14 14:31:42 o = 30 eθ

2004-07-14 14:32:15

(deg) eϕ 0 50 100 150 200 250 300

(deg) eθ

0

10

20

30

40

50

60 Entries 1995410

Mean x 154.2

Mean y 28.59

RMS x 103.5

RMS y 5.468

phi_e vs. theta_e vs. p_e_xy

2004-07-14 13:49:56

2004-07-14 13:50:05

2004-07-14 13:50:20

2004-07-14 13:51:26

2004-07-14 14:31:28

E = 2.56 GeV

2004-07-14 14:34:00